<script setup lang="ts">
// TODO: Implement public-facing server information page
</script>

<template>
  <div class="p-6">
    <h1 class="text-2xl font-bold text-neutral-100 mb-4">Server Info</h1>
    <p class="text-neutral-400">Public server information — rules, description, and connection details.</p>
  </div>
</template>
